// Depth sounder with alarm threshold.
import Gauge from './Gauge.jsx'

export default function DepthSounder({ depth }) {
  return (
    <Gauge
      value={depth}
      min={0}
      max={30}
      label="Depth"
      unit="m"
      warning={3}
      danger={1.5}
    />
  )
}
