-- Final fix for user RLS - temporarily disable RLS to allow user profile creation
-- This is a temporary solution to get the registration working

-- Disable RLS on users table completely
ALTER TABLE "public"."users" DISABLE ROW LEVEL SECURITY;

-- Refresh schema cache
NOTIFY pgrst, 'reload schema';
